/	File CP4DMF.HLP

/	Documentation of CP4DMF.ASM

/	last edit:	14-jun-1987	16:00:00	Charles J. Lasner (CJL)

/	CP4DMF, the program to "fix" the DECMATE KERMIT-80 environment to allow
/	formal half-duplex communication (with CMS-KERMIT) to work is run like
/	any other CP/M-80 program. It is invoked with:

/	E>CP4DMF(<CR>)

/	There is no response, other than the next monitor prompt.

/	Creating CP4DMF.COM .

/	CP4DMF.COM can be created by the normal method:

/	E>LOAD CP4DMF

/	This command requires the presence of CP4DMF.HEX on the current device.

/	CP4DMF.HEX can be acquired from the KERMIT distribution, or can be
/	assembled from CP4DMF.ASM (also available from the KERMIT distribution)
/	or can be hand-entered with DDT if all other methods are not possible.

/	Limitations of CP4DMF.

/	CP4DMF was created to solve the specific problem of the DECMATE
/	CP/M-80 KERMIT when communicating with half-duplex environments such
/	as CMS-KERMIT. It should not be used for any other purpose. (Similar
/	programs *SHOULD* exist for the ROBIN (VT-180) and RAINBOW (PC100), but
/	CP4DMF is DECMATE specific.) To restore the normal flow-control 
/	character handling, the user must re-boot or run CP4DMU.COM (see the
/	file CP4DM.BWR for more information).

/	Charles J. Lasner (OC.LASNER@CU20B) (CJL)
