/	File CP4DMU.HLP

/	Documentation of CP4DMU.ASM

/	last edit:	14-jun-1987	16:00:00	Charles J. Lasner (CJL)

/	CP4DMU, the program to "unfix" the DECMATE KERMIT-80 environment to
/	allow normal flow-control after using KERMIT-80 with half-duplex
/	communication (with CMS-KERMIT) is run like any other CP/M-80 program.
/	It is invoked with:

/	E>CP4DMU(<CR>)

/	There is no response, other than the next monitor prompt.

/	Creating CP4DMU.COM .

/	CP4DMU.COM can be created by the normal method:

/	E>LOAD CP4DMU

/	This command requires the presence of CP4DMU.HEX on the current device.

/	CP4DMU.HEX can be acquired from the KERMIT distribution, or can be
/	assembled from CP4DMU.ASM (also available from the KERMIT distribution)
/	or can be hand-entered with DDT if all other methods are not possible.

/	Limitations of CP4DMU.

/	CP4DMU was created to solve the specific problem of the DECMATE
/	CP/M-80 KERMIT after communicating with half-duplex environments such
/	as CMS-KERMIT. It should not be used for any other purpose. (Similar
/	programs *SHOULD* exist for the ROBIN (VT-180) and RAINBOW (PC100), but
/	CP4DMU is DECMATE specific.) Use of CP4DMU.COM obviates the need to
/	re-boot after running CP4DMF.COM (see the file CP4DM.BWR for more
/	information).

/	Charles J. Lasner (OC.LASNER@CU20B) (CJL)
