Date: 23-JUN-1986 15:48:50
From: SYSKERMIT%vax1.central.lancaster.ac.uk@Cs.Ucl.AC.UK
Subject: Hex file for Kermit-80 for Teletek

CP4TTK.HEX is for a Teletek CP/M-80 micro with an ADM 22 terminal.  It's from
David Moore, Software Development, APV Automation, Fleming Way, Crawley RH10
2YX, UK. Telphone (UK) 0293-51890.  Source will probably be built into Bertil
Schou's 4.07 release.
