UNT’s Accessing On-Line Bibliographic Databases

By Billy Barron, billy@vaxb.acs.unt.edu

(C) 1989, 1990, 1991 University of North Texas

Permission is granted to any individual or institution to use, copy, or distribute this document

freely as long as it is not sold for profit. Excerpts from this document may be used in other

documents provided they are not sold for a profit.

Additions, corrections, and deletions should be sent to billy@vaxb.acs.unt.edu. All additions

should contain signon instructions, signoff instructions, type of library software, and a contact

(no new entries without a contact will be added).

This document is mainly designed for a VT100 environment. Many of the library systems allow

other terminal types. At the point when VT100 is selected, you can choose other terminal types.

IBM mainframes can only connect to TN3270 sites.

Last Updated: March 20th, 1991

Table of Contents

Introduction . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 1

Aberdeen University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 2

Aberystwyth University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 2

ALEPH . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 3

Bar-Ilan University

Ben-Gurion University

Haifa University

Hebrew University

Technion

Tel Aviv University

Weizmann Institute of Science

Aston University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 3

Auburn . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 4

Australian Defence Force Academy . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 4

Australian National University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 4

Bangor University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 5

Bath University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 5

Birmingham University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 6

Boston University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 6

Brigham Young University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 7

Bristol University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 7

Brown University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 8

Brunel University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 8

Cal Poly State University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 9

California State University at Fresno . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 9

California State University at Long Beach . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 9

Cambridge University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 10

Carnegie Mellon University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 10

Case Western Reserve University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 10

City of London Polytechnic . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 11

City University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 11

City University of New York . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 12

Clemson University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 12

Cleveland Public Library . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 13

Colorado Alliance of Research Libraries . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 13

Auraria University

Boulder Public Library

CC LINK Community Colleges

Araphoe C.C.

Front Range C.C.

Lamar C.C.

Morgan C.C.

Otero Junior College

Pikes Peak C.C.

Pueblo C.C.

Red Rocks C.C.

Trinidad State Jr. College

Colorado Government Publications

Colorado Health Sciences Libraries

Association of Operating Room Nurses

C.U. Health Sciences Center

Denver Medical Library

Saint Joseph Hospital

Swedish Medical Center

Colorado School of Mines

Colorado State Department of Education

Colorado State Publications

Colorado State University

Denver Public Library

Denver University

High Plains Regional Libraries

Estes Park Public Library

Fort Morgan Public Library

Sterling Public Library

Luther College

MARMOT Library (Colorado Western Slopes)

Montegomery County (Rockville, MD)

Northeastern University

Northwest College

Pikes Peak Library (Colorado Springs)

Regis College/Teikyo Loretto University

University of Colorado at Boulder

University of Hawaii at Honolulu

University of Northern Colorado

University of Wyoming

Columbia University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 14

Cornell . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 14

Cranfield Institute of Technology . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 15

Curtin University of Technology . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 15

Dartmouth . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 15

Deakin University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 16

DRA (Library of Congress) . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 16

Dundee College of Technology . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 17

Dundee University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 17

Durham University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 18

East Anglia . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 18

Edinburgh University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 19

Edinburgh University Online Library Information System . . . . . . . . . . . . . . . . . . . . . . . 19

Eidgonoessische Technische Hochschule Zuerich . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 20

Emory University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 20

Essex University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 21

Exeter University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 21

Florida State University System . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 22

Florida A&M

Florida Atlantic

Florida State

Florida International

University of Central Florida

University of Florida

University of North Florida

University of South Florida

University of West Florida

Glasgow University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 22

Griffith University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 23

Harvard University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 23

Heriot-Watt University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 23

Hull University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 24

Indiana University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 24

Iowa State University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 25

Johns Hopkins University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 25

Kansas State University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 26

Kent University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 26

Kent State University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 27

Lancaster University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 27

Leeds University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 28

Lehigh . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 28

Leicester University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 29

Liverpool University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 29

London University Central Libertas Consortium . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 30

London Univ, British Library of Political & Economic Science . . . . . . . . . . . . . . . . . . . 30

London University, Imperial College . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 31

London University, Kings College . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 31

London University, Queen Mary and Westfield College . . . . . . . . . . . . . . . . . . . . . . . . 32

London University, University College . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 32

Loughborough University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 33

Macquarie University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 33

Manchester University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 33

Marquette University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 34

Michigan State University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 34

Monterrey Institute of Technology . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 35

Newcastle University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 35

New Mexico State University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 36

New York University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 36

NISSPAC . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 37

Northwestern University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 37

Nottingham University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 38

Occidental College . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 38

OCLC . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 38

Old Dominion University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 39

Ohio State University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 39

Oregon State University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 39

Oxford University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 40

Pennsylvania State University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 40

Polytechnic of Central London . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 41

Polytechnic South West . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 41

Princeton University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 42

Purdue . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 42

Queen’s University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 42

Queens University Belfast . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 43

Reading University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 43

Rensselaer Polytech Institute . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 43

Research Libraries Information Network . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 44

Rice University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 44

Royal Melbourne Institute of Technology . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 45

Rutgers University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 45

Rutherford Appleton Laboratory . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 46

St. Andrews University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 46

Salford University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 47

Sam Houston State University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 47

Sheffield University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 47

South Australian Institute of Technology . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 48

South Bank Polytechnic . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 48

Southern Methodist University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 48

Southampton University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 49

Stirling . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 49

Strathclyde University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 50

SUNY-Binghamton . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 50

Surrey University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 51

Sussex University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 51

Swansea University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 52

Texas A&M . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 52

Texas Woman’s University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 53

Thames Polytechnic . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 53

Triangle Research Libraries . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 53

Duke

North Carolina State University

University of North Carolina

Universidad de las Americas, Pueblas . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 54

University of Adelaide . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 54

University of Arizona . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 54

University of Calgary . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 55

University of California . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 55

California State . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 55

University of California at Berkeley . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 56

University of Chicago . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 56

University of Colorado at Colorado Springs . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 56

University of Dayton . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 57

University of Delaware . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 57

University of Hawaii at Manoa . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 57

University of Illinois at Urbana/Champaign . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 58

University of Illinois at Chicago . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 58

University of Iowa . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 59

University of Kansas . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 59

University of Konstanz . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 60

University of Maine . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 60

University of Manchester Institute of Science and Technology . . . . . . . . . . . . . . . . . . . 61

University of Maryland . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 61

University of Massachusetts, Boston . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 62

University of Melbourne . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 62

University of Michigan . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 62

University of Minnesota . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 63

University of Missouri at Columbia . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 63

University of Missouri at Rolla . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 64

University of Missouri at St. Louis . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 64

University of Nebraska . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 65

University of Nevada Las Vegas . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 65

University of Newcastle . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 66

University of New Brunswick . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 66

University of New England . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 66

University of New Mexico . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 67

University of New South Wales . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 67

University of North Texas . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 67

University of Notre Dame . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 68

University of Oregon . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 68

University of Pennsylvania . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 69

University of Pittsburgh . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 69

University of Queensland . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 70

University of Saskatchewan . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 70

University of Tennessee at Knoxville . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 71

University of Tennessee at Memphis . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 71

University of Texas Arlington . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 72

University of Texas Austin . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 72

University of Texas at Dallas . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 73

University of Texas Health Science Center at San Antonio . . . . . . . . . . . . . . . . . . . . . . 73

University of Texas Health Center at Tyler . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 73

University of Toledo . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 74

University of Toronto . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 74

University of Utah . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 74

University of Wales College of Cardiff . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 75

University of Western Australia . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 75

University of Wisconsin . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 76

University of York . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 76

Vanderbilt University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 77

Victoria University of Wellington . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 77

Virginia Commonwealth University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 78

Virginia Tech . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 78

Warwick University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 79

Washington University-St. Louis . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 79

Wayne State University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 80

Wright State University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 80

York University . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 80

Appendix A: Using DRA Altas . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 81

Appendix B: Using BLCMP . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 82

Appendix C: Using CATS . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 83

Appendix D: Using GEAC . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 84

Appendix E: Using Innovative Interfaces . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 85

Appendix F: Using Libertas . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 86

Appendix G: Using NOTIS . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 87

Appendix H: Using UTCAT . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 88

Appendix I: Using VTLS . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 90

Appendix J: TELNET/TN3270 Escape Keys . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 91

Introduction

Over the last several years, most university libraries have switched from a manual (card)

cataloging system to a computerized cataloging system. The computerized cataloging systems

provide users with easy to access and up-to-date information about the books available in the

library. This ease of access has been accomplished with the advent of local area networks, dialup

modems, and wide area networks. For example, anybody on the University of North Texas

campus who has access to the Sytek Local Area Network or the campus-wide Ethernet can access

the UNT’s library computer system. Also, UNT has dialup modems. Through these modems

anybody with a computer, a modem, and a telecommunication package, such as PROCOMM, can

access the library computer from home. The wide area networks allow users free access to other

universities’ library systems around the world.

Accessing these library systems are described in this document. Details of using various library

systems are described in Appendices A through I. Appendix J gives a list of TELNET and

TN3270 escape key sequences for various communications packages.

Sites that have access via SET HOST are only available to THENET nodes.

Aberdeen University

Location: Aberdeen UK

To access the Aberdeen University Library:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, type janet.

3. At the hostname prompt, type uk.ac.aberdeen.library.

4. At the Enter Selection prompt, enter 3.

See the "Using Dynix" section for more information.

To exit, choose option 9.

Aberystwyth University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, type janet.

3. At the hostname prompt, type uk.ac.aberystwyth.library.

4. At the Username prompt, enter LIBRARY.

5. Enter 1 as the terminal model.

See the "Using Libertas" section for more information.

To logout, type EXIT.

ALEPH

ALEPH (Automated Library Expandable Program - Hebrew university) is a distributed library

catalog sytem in Israel. Seven universities are connected: Bar-Ilan University, Ben-Gurion

University, Haifa University, Hebrew University, Technion, Tel Aviv University, and Weizmann

Institute of Science.

To access ALEPH:

1. Type one of the following TELNET commands:

TELNET ALEPH.BIU.AC.IL

TELNET TAUVAX.TAU.AC.IL

TELNET ALEPH.HUJI.AC.IL

TELNET WISLIB.WEIZMANN.AC.IL

TELNET LIB.TECHNION.AC.IL

2. At the USERNAME: prompt, type ALEPH.

3. When asked for terminal type, use 2 for VT100 TELNET or use 5 for TN3270.

4. At the Function Selection menu, choose 2.

To exit ALEPH:

1. Type STOP.

2. Choose option 1 on the Function selection menu.

Aston University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, type janet.

3. At the hostname prompt, type uk.ac.aston.geac.

4. Hit RETURN twice.

See the "Using Geac" section for more information.

To exit, type END.

Auburn

Location: Alabama, USA

To access the Auburn Library System:

1. Type TN3270 AUDUCACD.DUC.AUBURN.EDU.

2. Push <TAB> until the cursor is in the APPLICATION field.

3. Type 01.

4. Press <RETURN>.

See the "Using NOTIS" section for instructions on using Auburn’s library.

To exit, hit the Telnet escape key.

Australian Defence Force Academy

Location: Campbell, ACT Australia

To access the ADFA library system:

1. Type TELNET LIBRARY.ADFA.OZ.AU.

2. When prompted for a destination, enter LIBRARY.

3. When asked to login, type E.

To exit:

1. Pick the X option from the main menu.

Australian National University

Location: Canberra Australia

To access the ANU library catalog:

1. Type TELNET MICOM.ANU.EDU.AU.

2. At the ENTER CLASS prompt, enter URICA.

3. Press RETURN until the main menu appears.

To exit, use the TELNET escape key.

Bangor University

Location: UK

To access the Bangor University Library:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. At the hostname prompt, enter uk.ac.bangor.library.

4. Enter 1 when prompted for language.

5. Hit RETURN.

See the "Using Geac" section for usage information.

To exit, type END.

Bath University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, type janet.

3. Enter UK.AC.BATH.LIBRARY at the hostname prompt.

4. At the LOGIN prompt, enter OPAC.

To exit, use the TELNET escape key.

Birmingham University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. At the hostname prompt, enter UK.AC.BIRMINGHAM.LIBRARY.

See "Using BLCMP" for more information.

To exit, hit the TELNET escape key.

Boston University

Location: Boston, MA, USA

The Boston University Library System is known as TOMUS.

To access TOMUS:

1. Type TELNET LIBRARY.BU.EDU from any host connected to the Internet.

To exit TOMUS:

1. Type EXIT.

Brigham Young University

Location: Utah, USA

To access the BYU system:

1. Type TN3270 LIB.BYU.EDU.

2. Type BYLINE at the userid prompt.

3. Enter e on the next screen.

See the "Using NOTIS" section for details on using this library system.

To exit, use the TN3270 escape key.

Bristol University

Location: Bristol UK

To access the Bristol University library:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. Enter uk.ac.bristol.lib at the hostname prompt.

4. At the Username prompt, type LIBRARY.

5. Select 1 for VT100.

See the "Using Libertas" section for more information.

To exit, type EXIT.

Brown University

Location: Providence, Rhode Island USA

To access the Brown University library system:

1. Type TN3270 BROWNVM.BROWN.EDU.

2. At the BROWN logon screen: TAB to command field.

3. Enter DIAL JOSIAH.

4. TAB to the JOSIAH choice on the screen.

To logoff:

1. Enter ESC 0.

2. Select option 4 from menu.

3. Enter ESC 3.

4. Enter CTRL-P 1.

Brunel University

Location: UK

To access the Brunel University Library:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. At the hostname prompt, type uk.ac.brunel.library.

See the "Using BLCMP" section for more details.

To exit, type E.

Cal Poly State University

Location: San Luis Obispo, California USA

To access the Cal Poly State University online catalog:

1. Type TELNET LIBRARY.CALPOLY.EDU.

2. At the login: prompt, type polycat.

To exit:

1. Hit CTRL-D.

California State University at Fresno

To login:

1. Type TELNET CATICSUF.CSUFRESNO.EDU.

2. At the login prompt, type public.

To exit, type 0.

California State University at Long Beach

Location: Long Beach, California USA

To access the California State University library:

1. Type TELNET COAST.LIB.CSULB.EDU.

2. Enter VT100 at ENTER TERMINAL TYPE prompt.

3. Press RETURN a few times.

See the "Using NOTIS" section for details on how to use the CSU library system.

To exit, use the TELNET escape key.

Cambridge University

Location: Cambridge UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, type janet.

3. At the hostname prompt, enter uk.ac.cambridge.university-library.

4. Enter Y.

See the "Using CATS" section for more information.

To exit, type END.

Carnegie Mellon University

Location: USA

To access the CMU library:

1. Type TELNET CMULIBRARY.ANDREW.CMU.EDU.

2. Enter VT100 as terminal type.

3. Press RETURN.

4. Enter 1 at the menu.

To exit the CMU library:

1. Type Q.

Case Western Reserve University

Location: Cleveland, Ohio USA

To access the Case Western Reserve University library system:

1. Type TELNET EUCLID.CWRU.EDU.

See the section "Using GEAC" for details on using the CWRU library.

To exit, hit the TELNET escape key.

City of London Polytechnic

Location: London England

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Type janet at the login prompt.

3. Enter uk.ac.city-poly.tower-vax at the hostname prompt.

4. At the Username prompt, enter LIBRARY.

5. At the second Username prompt, enter LIBRARY again.

See the "Using Libertas" section for more information.

To exit, type EXIT.

City University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. At the hostname prompt, enter UK.AC.CITY.LIBRARY.

To exit, use the TELNET escape key.

City University of New York

Location: New York, New York USA

To access the CUNY library:

1. Type TN3270 CUNYVM.CUNY.EDU.

2. Press RETURN at the login screen.

3. Type DIAL VTAM.

4. Tab cursor to CUNYPLUS.

5. Hit CTRL-Z (clear screen).

6. Type LUCU.

See the section "Using NOTIS" for more information.

To exit, hit the TN3270 escape key.

Clemson University

Location: Clemson, South Carolina USA

To access the Clemson University library system:

1. Type TN3270 CLEMSON.CLEMSON.EDU.

2. Choose option B on the menu.

3. Push <RETURN>.

See the "Using NOTIS" section for more information.

To exit this system, use the TN3270 escape key.

Cleveland Public Library

Location: Cleveland, Ohio USA

To access the CPL:

1. Type TELNET LIBRARY.CPL.ORG.

2. Select 1 on the menu.

3. Select 1 on the next menu.

To logoff:

1. Hit CTRL-Z.

2. Select 5 on the menu.

3. Select 5 on the menu.

Colorado Alliance of Research Libraries

Location: Colorado USA

The Colorado Alliance of Research Libraries (CARL) include Auraria University, Boulder Public

Library, CC LINK Community Colleges (Araphoe C.C., Front Range C.C., Lamar C.C., Morgan

C.C., Otero Junior College, Pikes Peak C.C., Pueblo C.C., Red Rocks C.C., Trinidad State Jr.

College), Colorado Government Publications, Colorado Health Sciences Libraries (Association

of Operating Room Nurses, C.U. Health Sciences Center, Denver Medical Library, Saint Joseph

Hospital, Swedish Medical Center), Colorado School of Mines, Colorado State Department of

Education, Colorado State Publications, Colorado State University, Denver Public Library, Denver

University, High Plains Regional Libraries (Estes Park Public Library, Fort Morgan Public

Library, Sterling Public Library), Luther College, MARMOT Library (Colorado Western Slopes),

Montegomery County (Rockville, MD), Northeastern University, Northwest College, Pikes Peak

Library (Colorado Springs), Regis College/Teikyo Loretto University, University of Colorado at

Boulder, University of Hawaii at Honolulu, University of Northern Colorado, and the University

of Wyoming. To access CARL:

1. Type TELNET PAC.CARL.ORG.

2. When prompted for terminal type, enter 5 for VT100 emulation.

To logout, hit the TELNET escape key.

Columbia University

Location: New York, New York USA

To access the Columbia University Library (CLIO):

1. Type TELNET CLIO.CUL.COLUMBIA.EDU.

2. Press RETURN to wake up terminal controller.

3. When access for terminal type, type VT-100.

4. Press RETURN to wake up CLIO.

See the "Using NOTIS" section for usage instructions.

To exit, hit the TELNET escape key.

Cornell

Location: USA

To access the Cornell Library System:

1. Type TN3270 CORNELLC.CIT.CORNELL.EDU.

2. When userid/password screen appears, press RETURN.

3. When CP READ appears on the screen, type LIBRARY.

See the "Using NOTIS" section for details.

To leave the Cornell Library System:

1. Type X.

Cranfield Institute of Technology

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. Enter uk.ac.cranfield.library at the hostname prompt.

4. At the Username prompt, enter JANET.

5. Enter 1 as terminal model.

See the "Using Libertas" section for more information.

To exit, type EXIT.

Curtin University of Technology

Location: Bentley, WA Australia

To access:

1. Type TELNET CC.CURTIN.EDU.AU.

2. Enter A for VT100 emulation.

To exit, enter E.

Dartmouth

Location: Hanover, New Hampshire USA

To access the Dartmouth Library:

1. Type TELNET LIB.DARTMOUTH.EDU from any host connected to the Internet.

2. When prompted for terminal type, enter VT100.

To exit the Dartmouth Library:

1. Type BYE.

Deakin University

Location: Geelong, Victoria Australia

To access the Deakin University Online Catalog, Alice:

1. Type TELNET LIBRARY.DEAKIN.OZ.AU.

2. At the login: prompt, type alice.

To exit Alice:

1. Type RETURN ~. RETURN.

DRA (Library of Congress)

Location: St. Louis, Missouri USA

Data Research Associates has made the 3.8 million cataloging records from the Library of

Congress available. Only two guest users are allowed access between 8am and 5pm (Central

Time). This database is not the same as the Library of Congress card catalog and may not be

used for cataloging or competitive purposes. Access from outside the US may require prior

arrangements.

To access:

1. Type TELNET DRA.COM.

To exit, type EX.

Dundee College of Technology

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, type janet.

3. Enter uk.ac.dundee-tech.library at the hostname prompt.

4. Press RETURN.

See the "Using Dynix" section for more information.

To exit, hit the TELNET escape key.

Dundee University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. At the hostname propmt, type uk.ac.dund.libb.

4. At the second login prompt, enter library.

See the "Using Dynix" section for more information.

To exit, type 7 on the menu.

Durham University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. At the hostname prompt, type uk.ac.durham.library.

4. Press RETURN.

See the "Using Geac" section for more information.

To exit, type E.

East Anglia

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login propmt.

3. At the hostname prompt, enter uk.ac.east-anglia.computing-centre.info.

4. At the Username prompt, enter INFO.

See the "Using CATS" section for more details.

To exit, type EXIT.

Edinburgh University

Location: Edinburgh UK

To access the Edinburgh University library:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. At the hostname prompt, enter uk.ac.edinburgh.geac.

4. Press RETURN twice.

See the "Using Geac" section for more information.

To exit, type END.

Edinburgh University Online Library Information System

Location: Edinburgh UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. At the hostname prompt, type UK.AC.ED.EMAS-A.

4. At the user prompt, enter LIBRARY.

5. At the pass prompt, type GUEST.

6. Select 33 as the terminal type for VT100.

To exit, type Q.

Eidgonoessische Technische Hochschule Zuerich

(Swiss Federal Institute of Technology, Zurich)

Location: Zurich, Switzerland

To access:

1. Type TELNET ETHICS.ETHZ.CH.

2. At the enter terminal type prompt, enter VT100.

3. Hit RETURN twice.

4. Choose D for Deutsch (German) or F for French interface.

To exit, hit the TELNET escape key.

Emory University

Location: USA

To access the Emory library:

1. Type TN3270 EMUVM1.CC.EMORY.EDU.

2. Press RETURN.

3. When CP READ appears, type DIAL VTAM.

4. When VTAM screen appears, type LIB.

5. When CICS screen appears, hit ESC and then 1.

To exit, hit the TN3270 escape key.

Essex University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. Enter uk.ac.sx.sersun1 at the hostname prompt.

4. At the login prompt, enter library.

5. Enter VT100 as the terminal type.

To logout, type QUIT.

Exeter University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. At the hostname prompt, enter UK.AC.EX.LIB.

4. Enter LIBRARY at the username prompt.

5. Enter 1 for VT100.

See the "Using Libertas" section for more information.

To exit, type EXIT.

Florida State University System

Location: Gainesville, Florida USA

The Florida State University System includes Florida A&M, Florida Atlantic, Florida State,

Florida International, University of Central Florida, University of Florida, University of North

Florida, University of South Florida, University of West Florida

To access these Florida library systems:

1. Type TN3270 NERVM.NERDC.UFL.EDU.

2. Press RETURN.

3. Type DIAL VTAM.

4. On the NERDC VTAM IS ACTIVE screen, enter NERLUIS FCLSKYA.

See the "Using NOTIS" section for usage instructions.

To exit:

1. TYPE %OFF.

2. When NERDC VTAM IS ACTIVE appears, enter UNDIAL.

Glasgow University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. At the hostname prompt, type uk.ac.glasgow.library.

See the "Using Geac" section for more information.

To exit, type END.

Griffith University

Location: Nathan, QLD Australia

To access:

1. Type TELNET LIBRARY.GU.EDU.AU.

To exit, use the TELNET escape key.

Harvard University

Location: Boston, MA USA

To access HOLLIS (Harvard’s OnLine Library Information System):

1. Type TN3270 HOLLIS.HARVARD.EDU.

2. Type hollis on the Harvard Univ./Office for Information Technology screen.

or

1. Type TELNET HOLLIS.HARVARD.EDU.

2. Press RETURN when Mitek Server screen appears.

3. Type hollis on the Harvard Univ./Office for Information Technology screen.

To exit HOLLIS:

If you used TELNET, hit ESCAPE xx. If you used TN3270, then use the TN3270 escape key.

Heriot-Watt University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. Enter UK.AC.HERIOT-WATT.LIBRARY at the hostname prompt.

To exit, hit the TELNET escape key.

Hull University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. At the hostname, enter uk.ac.hull.li.geac.

See the "Using Geac" section for more details.

To exit, type E.

Indiana University

Location: Indiana, USA

To access the Indiana University library:

1. Type TN3270 IUIS3270.UCS.INDIANA.EDU.

2. Pick 4 on the menu.

or

1. Type TELNET IUIS.UCS.INDIANA.EDU.

2. Enter VT100 as the terminal type.

3. Pick 4 on the menu.

See the "Using NOTIS" section for more details.

To exit the Indiana University library:

1. Enter Q.

2. Enter Q again.

Iowa State University

Location: Iowa USA

To logon:

1. Type TELNET ISN.IASTATE.EDU.

2. At the DIAL prompt, type LIB.

3. At the ENTER TERMINAL TYPE prompt, type VT100.

4. At the MVS welcome screen, type SCHOLAR.

Use the search instructions for NOTIS catalogs.

To Logoff:

1. On the SCHOLAR command line, type QUIT.

Johns Hopkins University

To access the Johns Hopkins system:

1. Type TELNET JHUVM.HCF.JHU.EDU.

2. Enter 04 at the "Please enter one of the following" prompt.

3. Hit RETURN at the JHU/HAC logo screen.

4. At the command prompt, type DIAL JANUS.

5. When the port assignment appears in the upper left corner of the screen, press RETURN.

See the "Using NOTIS" section for more information.

To exit, type ####.

Kansas State University

Location: Kansas USA

To access the KSU catalog:

1. Type TN3270 KSUVM.KSU.EDU.

2. Type LYNX.

or

1. Type TELNET TELNET.KSU.EDU.

2. Select destination as KSUVM.

3. Enter VT100 at terminal type prompt.

4. Type LYNX.

See the "Using NOTIS" appendix for more information.

To exit:

1. Type QUIT.

Kent University

Location: Kent England

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. Enter uk.ac.ukc.iris at the hostname prompt.

4. At the Username prompt, enter UKCLIB.

5. Enter UKCLIB as the password.

6. At the Username prompt, enter CATS.

See the "Using CATS" section for more information.

To exit, hit Q.

Kent State University

Location: Ohio USA

To access Kent State University’s library:

1. Type TELNET CATALYST.KENT.EDU.

2. Push <RETURN>.

3. At the ENTER TERMINAL TYPE prompt, enter VT100.

4. At the SELECT APPLICATION prompt, enter D.

5. At the CICS screen, enter LUKS.

See the "Using NOTIS" section for more details.

To exit, hit the TELNET escape key.

Lancaster University

Location: Lancaster England

To access the Lancester online library:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, type janet.

3. Enter uk.ac.lancaster.library at the hostname prompt.

4. Press RETURN.

To exit, use the TELNET escape key.

Leeds University

Location: Leeds England

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. Enter uk.ac.leeds at the hostname prompt for the Main Library.

Enter uk.ac.leeds.libcat for the Medical and Dental Library.

4. Main library only: At the Enter Called Address prompt, type LIB.

See the "Using Geac" section for more information.

To exit, type E.

Lehigh

Location: Pennsylvania USA

To access Lehigh’s library:

1. Type TELNET ASA.LIB.LEHIGH.EDU.

See the "Using GEAC" section for more details.

To exit:

1. Type END.

Leicester University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. Enter uk.ac.leicester.library at the hostname prompt.

4. Enter LIBRARY at the Username prompt.

Using the "Using Libertas" section for more information.

To exit, type END.

Liverpool University

Location: Liverpool England

To access Liverpool:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. At the hostname prompt, enter UK.AC.LIVERPOOL.LIBRARY.

4. When terminal type is requested, type VT100.

5. When the screen clears, hit RETURN.

To logout:

1. Enter E.

2. Select 5 off the menu.

London University Central Libertas Consortium

Location: London England

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. At the hostname prompt, enter UK.AC.LON.CONSULL.

4. At the Username prompt, enter LIBRARY.

5. Enter 1 for terminal model.

See the "Using Libertas" section for more information.

To exit, type EXIT.

London Univ, British Library of Political & Economic Science

Location: London England

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. Enter UK.AC.LSE.BLPES at the hostname prompt.

4. At the Username prompt, enter LIBRARY.

5. When prompted for terminal model, enter 1.

See the "Using Libertas" section for usage information.

To exit, type EXIT.

London University, Imperial College

Location: London England

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. At the hostname prompt, type UK.AC.IMPERIAL.LIB.

4. At the Username prompt, enter LIBRARY.

5. When prompted for the terminal model, enter 1.

See the "Using Libertas" section for more information.

To logout, type EXIT.

London University, Kings College

Location: London England

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. At the hostname prompt, type UK.AC.KCL.LIB.

4. At the Username prompt, enter LIBRARY.

See the "Using Libertas" section for more details.

To logout, type EXIT.

London University, Queen Mary and Westfield College

Location: London England

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. At the hostname prompt, enter UK.AC.QMC.LIB.

4. At the Username prompt, enter LIBRARY.

5. Enter 1 for terminal model.

See the "Using Libertas" section for more information.

To logout, type EXIT.

London University, University College

Location: London England

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. At the hostname prompt, enter UK.AC.UCL.LIB.

4. At the Username propmt, enter LIBRARY.

5. Enter 1 for terminal model.

See the "Using Libertas" section for more information.

To exit, type EXIT.

Loughborough University

Location: UK

To access the Loughborough University library:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. At the hostname prompt, enter UK.AC.LOUGHBOROUGH.LIBRARY.

See the "Using BLCMP" section for more information.

To exit, type E.

Macquarie University

Location: NSW Australia

To access:

1. Type TELNET MARS.MQCC.MQ.OZ.AU.

To exit, use the TELNET escape key.

Manchester University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. At the hostname prompt, enter UK.AC.MAN.CN.XB.

4. At the Owens Class prompt, enter LIBRARY.

5. When prompted for terminal type, type VT100.

To exit, hit X.

Marquette University

Location: Wisconsin USA

To access:

1. Type TELNET LIBUS.CSD.MU.EDU.

2. At the login prompt, type m.

3. Select v at the TERMINAL prompt.

4. Confirm with y.

See the "Using Innovative Interfaces" section for more information.

To exit, select the Q option off the menu.

Michigan State University

Location: Michigan USA

To access the Michigan State University library system:

1. Type TN3270 MAGIC.LIB.MSU.EDU.

2. At the VM370 screen, type DIAL MAGIC.

3. At the Terminal Emulator screen, enter VT100.

or

1. Type TELNET MERIT.MSU.EDU.

2. At the Which Host? prompt, enter MAGIC.

3. At the terminal id, enter VT100.

See the "Using NOTIS" section for more instructions.

To exit, use the TELNET or TN3270 escape key.

Monterrey Institute of Technology

Location: Monterrey Mexico

To access the Monterrey Institute of Technology library:

1. T y p e S E T H O S T M T E C V 2 f r o m t h e V A X c l u s t e r o r T E L N E T

MTECV2.MTY.ITESM.MX.

2. At the username prompt, type MTYCAT.

To exit:

1. Select the menu option "Salir del Sistema".

Please note that all instructions are in Spanish. An English interface is supposed to be added

soon.

Newcastle University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. At the hostname prompt, enter UK.AC.DURHAM.GATE.

4. At the which service prompt, enter NCL.INFO.

See the "Using CATS" section for more information.

To exit, type STOP.

New Mexico State University

Location: New Mexico USA

To access the New Mexico State University library:

1. Type TELNET LIBRARY.NMSU.EDU.

2. At the : prompt, type hello user.libr01.

3. When asked for terminal type, enter 5.

4. When asked for location code, enter 0100.

See the "Using VTLS" section for usage instructions.

To exit the NMSU library system:

1. Enter /QUIT.

New York University

Location: New York, New York USA

To login the NYU on-line library catalog:

1. Type TELNET BOBCAT.NYU.EDU.

2. Hit <RETURN>.

See the "Using GEAC" section for usage instructions.

To exit:

1. Type END.

NISSPAC

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the hostname prompt.

3. At the hostname prompt, type UK.AC.NISS.PAC.

4. At the . prompt, enter LOGON NISSCAT.

To exit:

1. Enter 99.

2. Enter Y when asked if you are sure.

Northwestern University

Location: Illinois USA

To access the Northwestern University catalog:

1. Type TELNET PACX.ACNS.NWU.EDU from any host connected to the Internet.

2. Press RETURN twice.

3. At the ENTER CLASS prompt, type LUIS.

4. Press RETURN twice.

5. Enter VT100 as terminal type.

See the "Using NOTIS" section for details on using the Northwestern library.

Hit the TELNET escape key to exit.

Nottingham University

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. At the hostname prompt, enter UK.AC.NOTTINGHAM.LIBRARY.

4. At the Username prompt, type LIBRARY.

5. Select 1 for VT100 emulation.

See the "Using Libertas" section for more information.

To exit, hit the TELNET escape key.

Occidental College

To access Occidental’s library catalog:

1. Type TELNET KITTY.OXY.EDU.

2. Type OASYS at the ENTER RESOURCE NAME prompt.

3. At the login prompt, type oasys.

4. Pick v as your terminal type.

5. Enter y to confirm.

See the "Using Innovative Interfaces" section for usage information.

To exit, type D.

OCLC

To access OCLC Reference Services:

1. Type TELNET EPIC.PROD.OCLC.ORG.

You will need an authorization code to use OCLC however.

Old Dominion University

Location: Norfolk, Virginia USA

To access:

1. Type TELNET GEAC.LIB.ODU.EDU.

See the "Using VTLS" section for details.

To exit:

1. Type END or QUIT.

Ohio State University

Location: Ohio USA

To access the Ohio State online catalog:

1. Type TELNET LCS.US.OHIO-STATE.EDU.

2. Choose 0 as your terminal type.

3. Type HELP to see options.

To exit, hit the TELNET escape key.

Oregon State University

Location: Oregon USA

To access:

1. Type TELNET SYTEK.UCS.ORST.EDU.

2. Type OASIS at destination prompt.

3. Enter OASIS.

4. Enter 11 for VT100 emulation.

To exit, use the TELNET escape key.

Oxford University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. At the hostname prompt, enter uk.ac.ox.pacx.

4. When prompted for which service, enter LIBRARY.

5. Enter VT100 as your terminal type.

To exit, hit the TELNET escape key.

Pennsylvania State University

Location: University Park, Pennsylvania USA

The Penn State library catalog system is known as LIAS.

To access LIAS:

1. Type TELNET LIAS.PSU.EDU.

2. Normally, VT100 should be negotatied at this point. If you have terminal emulation

problems, try typing TERMINAL VT100 at the >>> prompt.

To exit LIAS, type QUIT or EXIT.

Polytechnic of Central London

Location: London England

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. At the hostname prompt, enter UK.AC.PCL.YAK.

4. At the User prompt, type LIBRARY.

5. When prompted for terminal model, enter 1.

See the "Using Libertas" section for more information.

To exit, type EXIT.

Polytechnic South West

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. At the hostname prompt, enter UK.AC.POLY-SOUTH-WEST.LIBRARY.

4. At the username prompt, enter LIBRARY.

5. Enter 1 as the terminal model.

See the "Using Libertas" for details.

To exit, type EXIT.

Princeton University

Location: Princeton, New Jersey USA

To access Princeton’s catalog:

1. Type TELNET CATALOG.PRINCETON.EDU.

To exit:

1. Type LOGOFF or END.

Purdue

Location: Indiana USA

To access the Purdue online catalog (THOR):

1. Type TN3270 LIB.CC.PURDUE.EDU.

See the "Using NOTIS" section for usage instructions.

To exit THOR, use the TN3270 escape key.

Queen’s University

Location: Canada

To access the Queen’s University library:

1. Type TN3270 QUCDNADM.QUEENSU.CA.

See the "Using NOTIS" section for usage instructions.

To exit, use the TN3270 escape key.

Queens University Belfast

Location: Belfast

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, type janet.

3. At the hostname prompt, enter UK.AC.QUEENS-BELFAST.LIBRARY.

4. Press RETURN.

See the "Using BLCMP" section for more information.

To exit, use the TELNET escape key.

Reading University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. At the hostname propmt, enter UK.AC.RDG.LINNET.

To exit, use the TELNET escape key.

Rensselaer Polytech Institute

Location: Troy, New York USA

To access RPI’s library computer:

1. Type TELNET INFOTRAC.RPI.EDU.

2. Enter VT100 as terminal type.

3. On the NIM screen, press RETURN.

To exit:

1. Type STOP.

Research Libraries Information Network

Location: Mountain View, CA USA

To access the RLIN bibliographic database:

1. Type TELNET RLIN.STANFORD.EDU for a full-duplex connection.

Type TELNET RLG.STANFORD.EDU for a half-duplex connection.

Note: You must have an account to use RLIN. Call (800) 537-RLIN or send e-mail to

bl.ric@rlg.stanford.edu for more information.

Rice University

Location: Houston, TX USA

To access Rice’s library system:

1. Type TN3270 LIBRARY.RICE.EDU.

2. When signon screen appears, hit TAB twice.

3. On COMMAND ==> line, type DIAL LIBRIS.

4. CTRL-Z to clear the screen.

See the "Using NOTIS" section for usage instructions.

To logoff, use the TN3270 escape key.

Royal Melbourne Institute of Technology

Location: Melbourne, VIC Australia

To access the R.M.I.T Library Computer:

1. Type TELNET CCANNEX02.XX.RMIT.OZ.AU.

2. Press RETURN.

3. When menu appears, select either VICNET96 or VICNET24.

4. At the "Which System?" prompt, enter MATLAS.

Alternate access method:

1. Type TELNET VICNET.XX.RMIT.OZ.AU.

2. At the "Which System?" prompt, enter MATLAS.

See the "Using GEAC" section for usage instructions.

To logoff, type END.

Rutgers University

Location: New Jersey USA

To access the Rutgers University library system:

1. Type TELNET LIBRARY.RUTGERS.EDU.

2. Press <RETURN>.

See the "Using GEAC" section for details.

To exit:

1. Type END.

Rutherford Appleton Laboratory

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. Enter UK.AC.RUTHERFORD.IBM-B at the hostname prompt.

4. Select 24 as your page size.

5. Enter LOGON LIB7 (LIB4, LIB5, or LIB8).

6. Enter password based on season. For example, Mar-May 91 is SPRING91, Jun-Aug 91

SUMMER91, Sept-Nov 91 is AUTUMN91, Dec-Feb 92 is WINTER91.

7. Enter NO to continue.

8. Enter Y to enter the library system.

To exit, type END.

St. Andrews University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. Enter UK.AC.ST-ANDREWS.LIB at the hostname prompt.

4. Press RETURN.

To exit, type 9.

Circulation System

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. Enter UK.AC.ST-ANDREWS.CIRCON at the hostname prompt.

4. Enter 1 at the enter number prompt.

To exit, hit RETURN on a blank line.

Salford University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. At the hostname prompt, enter UK.AC.SALFORD.SAISO.

4. Press RETURN.

See the "Using BLCMP" section for more information.

To exit, use the TELNET escape key.

Sam Houston State University

Location: Huntsville, TX USA

The SHSU Library is available on THENET. The following steps can be used to access it.

1. Type SET HOST LOKI.

2. At the Username: prompt, type LIBRARY.

See the "Using DRA Altas" section for more information.

Exiting: To exit, just hit CTRL-Z.

Sheffield University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. At the hostname prompt, enter UK.AC.SHEFFIELD.LIBRARY.

See the "Using BLCMP" section for more information.

To exit, use the TELNET escape key.

South Australian Institute of Technology

Location: The Levels, SA Australia

To access this library system:

1. Type TELNET LV.SAIT.EDU.AU.

2. Enter OPAC at the Username prompt.

To exit, hit CTRL-\.

South Bank Polytechnic

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. Enter UK.AC.SBANK.SWITCH at the hostname prompt.

4. Choose option G.

5. After the "connected to port" message, press RETURN.

See the "Using Geac" section for more information.

To exit, type E.

Southern Methodist University

Location: Dallas, TX USA

To access the SMU library catalog:

1. Type TN3270 VM.CIS.SMU.EDU.

2. When the sign-on screen appears, enter PONI.

3. On the CICS screen, press CTRL-Z (the clear key).

4. Enter lusm.

See the "Using NOTIS" section for usage instructions.

To exit, use the TN3270 escape key.

Southampton University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, enter janet.

3. Enter UK.AC.SOUTHAMPTON.USING at the hostname prompt.

4. At the . prompt, enter LOGIN USING.

To logout, type QUIT.

Stirling

Location: UK

To login:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. At the hostname prompt, enter UK.AC.STIRLING.LIBRARY.

4. At the name/address prompt, enter library.

5. At the login prompt, enter janet.

See the "Using Dynix" section for more information.

To exit, type OFF.

Strathclyde University

Location: UK

To login:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. At the hostname prompt, enter UK.AC.STRATHCLYDE.LIBRARY.

See the "Using GEAC" section for more information.

To exit, type END.

SUNY-Binghamton

Location: Binghamton, NY USA

To login into SUNY-Binghamton’s computer:

1. Type TN3270 BINGVMC.CC.BINGHAMTON.EDU.

2. Press TAB twice.

3. At the COMMAND prompt, type DIAL VTAM.

4. Enter ELIXIR.

5. Press RETURN several times.

See the "Using NOTIS" section for instructions.

To hangup, hit the TN3270 escape key.

Surrey University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. Enter UK.AC.SURREY.SYSI at the hostname prompt.

4. Type LOGON MCS999.

5. Type SIS at the password.

6. Select option 6 off the menu.

To exit:

1. Hit X on the main menu.

2. Select option 99 from the MCS menu.

Sussex University

Location: UK

To login:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, type janet.

3. At the hostname prompt, enter UK.AC.SUSSEX.LIBRARY.

To exit, use the TELNET escape key.

Swansea University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. Enter UK.AC.SWANSEA.LIBRARY at the hostname prompt.

4. At the username prompt, enter LIBRARY.

See the "Using Libertas" section for more information.

To exit, type EXIT.

Texas A&M

Location: College Station, TX USA

The following steps are used to access the Texas A&M Library.

1. Type TN3270 TAMVM1.TAMU.EDU.

2. TAB down to Command prompt.

3. Type DIAL VTAM.

4. At the Texas A&M Statewide Network screen, type NOTIS.

5. At the CICS screen, hit RETURN.

or

1. Type SET HOST VENUS from the THENET or TELNET VENUS.TAMU.EDU from

any machine connected to the Internet.

2. At the Username: prompt, type VTAM.

3. At the Texas A&M Statewide Network screen, type NOTIS.

4. At the CICS screen, hit RETURN.

See the "Using NOTIS" section for more information.

To exit, hit CTRL-Z.

Texas Woman’s University

Location: Denton, TX USA

To access the TWU online library:

1. Type SET HOST TWUV1.

2. At the Username: prompt, type IRIS.

3. Press RETURN several times when prompted to.

See the "Using GEAC" section for details.

To exit:

1. Hit CTRL-\.

Thames Polytechnic

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the login prompt, type janet.

3. Enter UK.AC.THAMES.LIB at the hostname prompt.

See the "Using BLCMP" section for more information.

To exit, use the TELNET escape key.

Triangle Research Libraries

Location: North Carolina, USA

The Triangle Research Libraries include the libraries for Duke, North Carolina State University,

and University of North Carolina.

To access:

1. Type TELNET LIBROT1.LIB.UNC.EDU.

To exit, use the TELNET escape key.

Universidad de las Americas, Pueblas

Location: Pueblas Mexico

The Universidad de las Americas in Mexico can be accessed as follows:

1. Type TELNET BIBES.PUE.UDLAP.MX.

2. At the username prompt, type LIBRARY.

To exit, hit the TELNET escape key.

University of Adelaide

Location: Adelaide, SA Australia

To access:

1. Type TELNET LIBRARY.ADELAIDE.EDU.AU.

2. At the login prompt, enter bslnet.

See the "Using Dynix" section for more information.

To exit, type 11.

University of Arizona

Location: Arizona, USA

To access the University of Arizona library:

1. Type TELNET IDX.TELCOM.ARIZONA.EDU.

2. Press RETURN repeatedly until something happens.

3. Type geac for the main circulation system or libpac for the Science/Engineering and

Center for Creative Photography collections.

If you select the geac option, see the "Using GEAC" section for more information.

To exit, use the TELNET escape key.

University of Calgary

Location: Calgary, CA

To use the University of Calgary library:

1. Type TELNET DEVELNET.UCALGARY.CA.

2. At the Request: prompt, type LIBRARY.

3. Select 0C as your brand of terminal.

4. When the screen blanks, hit RETURN.

5. Hit RETURN on the University of Calgary screen.

Use the TELNET escape key to end your session.

University of California and California State

Location: Oakland, California USA

The library system is known as MELVYL. MELVYL contains library information for all

university in the University of California system and the California State library.

To access MELVYL:

1. Type TELNET MELVYL.UCOP.EDU on any host connected to the Internet.

2. When asked for terminal type, enter VT100.

3. Press RETURN when prompted to.

4. Type START LOOK for easy to use library system.

- or -

Type START COM for command line library system.

To logoff of MELVYL:

1. Type END or STOP.

2. Type LOGOFF.

University of California at Berkeley

Location: Berkeley, California USA

To access the UCB’s library system, GLADIS:

1. Type TELNET GOPAC.BERKELEY.EDU.

To exit GLADIS:

1. Type LOGOFF.

University of Chicago

Location: Chicago, Illinois USA

To access the University of Chicago Library:

1. Type TELNET OLORIN.UCHICAGO.EDU from any host connected to the Internet.

2. At the ENTER CLASS prompt, type lib48.

3. When CONNECTED appears on the screen, press RETURN.

To leave the University of Chicago library:

1. Type LOGOUT.

University of Colorado at Colorado Springs

Location: Colorado Springs, Colorado USA

To access:

1. Type TELNET ARLO.COLORADO.EDU.

2. When prompted for login code, enter ARLO.

3. At the logo screen, hit RETURN.

To exit:

1. Pick option 12 on the menu.

2. Use the TELNET escape key.

University of Dayton

Location: Dayton, Ohio USA

To access:

1. Type TELNET UDAPRL.OCA.UDAYTON.EDU.

2. At the blank screen or the ! prompt, type LOGIN PUB02.

3. When prompted for terminal type, select 2 for VT100.

See the "Using Dynix" section for more information.

To logoff, select the option from the menu or type Q.

University of Delaware

Location: Newark, Delaware USA

To access the University of Delaware catalog (DELCAT):

1. Type TELNET DELCAT.UDEL.EDU from any host connected to the Internet.

2. Press RETURN.

3. At TERMINAL TYPE prompt, type VT100.

4. Press RETURN.

See the "Using NOTIS" section for instruction on using the University of Delaware’s library.

To exit, type EXIT.

University of Hawaii at Manoa

Location: Manoa, Hawaii USA

University of Hawaii at Manoa requires a registration process. To use this system, send the

following information to uhlib@uhccux.uhcc.hawaii.edu:

Your Name, Your Initials, Position/Title, Full Internet and/or BITNET electronic mail

address(es), Campus/College, Dept. Address, and Dept. Phone Number.

Please allow at least 2 weeks for application processing. Your account and instructions will be

emailed to you.

University of Illinois at Urbana/Champaign

Location: Urbana/Champaign, Illinois USA

To access the University of Illinois at Urbana/Champaign catalog:

1. Type TELNET GARCON.CSO.UIUC.EDU 620.

or

1. Type TELNET GARCON.CSO.UIUC.EDU.

2. Enter LCS at the username prompt.

To logoff the catalog:

1. Type EXIT.

University of Illinois at Chicago

Location: Chicago, Illinois USA

To access the University of Illinois at Chicago catalog (LUIS):

1. Type TN3270 UICVM.UIC.EDU.

2. When signon screen appears, hit RETURN.

3. Type DIAL PVM.

4. Move the cursor on the first S of "S NOTIS" by using the TAB or arrow keys.

5. Press RETURN.

See the "Using NOTIS" section for instructions.

Exiting: 1. Type ####.

2. Press CTRL-P 1.

University of Iowa

Location: Iowa USA

To access the University of Iowa library:

1. Type TELNET OASIS.UIOWA.EDU.

2. At the terminal type prompt, enter VT100.

3. Choose option 1 on the menu, OASIS.

See the "Using NOTIS" section for more information.

To logout:

1. Type X on the main menu.

University of Kansas

Location: Kansas USA

To access the University of Kansas library:

1. Type TELNET KUHUB.CC.UKANS.EDU.

2. At the username prompt, type RELAY.

3. At the SYSTEM? prompt, type OCAT.

4. At the ENTER TERMINAL TYPE prompt, type VT100.

5. On the CICS screen, type OCAT.

To leave the University of Kansas Library:

1. Type LOGOFF.

2. Type Q.

University of Konstanz

Location: Konstanz, Federal Republic of Germany

To login:

1. Type TELNET POLYDOS.UNI-KONSTANZ.DE 775.

The user interface is in German.

To exit, type ENDE.

University of Maine

Location: Maine USA

To access the University of Maine library:

1. Type TELNET URSUS.MAINE.EDU.

2. Login in as ursus.

3. Enter v for VT100.

4. Enter y to confirm.

See the "Using Innovative Interfaces" section.

To logout:

1. Type B.

University of Manchester Institute of Science and Technology

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. Enter UK.AC.UMIST.CENTRAL-SERVICES.PRIME-A at the hostname prompt.

4. Type LOGIN LIBRARY.

5. Enter LIBRARY as the password.

6. When asked for terminal type, enter VT.

7. Press RETURN twice.

To exit, type 9.

University of Maryland

Location: College Park, Maryland USA

The University of Maryland library covers five of their campuses (UM College Park, UMBC,

UMES, UMAB-Law, and UMUC).

To access the UM library:

1. Type TELNET UMCAT.UMD.EDU on any host connected to the Internet.

2. Press RETURN.

See the "Using GEAC" section for details.

To exit, hit the TELNET escape key.

University of Massachusetts, Boston

Location: Boston, Massachusetts USA

To connect to the UMB library:

1. Type TELNET NS.UMB.EDU.

2. At the login: prompt, enter LIBRA::.

3. At the username: prompt, enter CATALOG.

4. Select your terminal type, enter 1 for VT100.

To exit:

1. Type EXIT, END, or QUIT.

University of Melbourne

Location: Parkville, VIC Australia

To access the University of Melbourne library:

1. Type TELNET LIBRARY.UNIMELB.EDU.AU.

To exit:

1. Hit CTRL-X.

University of Michigan

Location: Michigan USA

To access the University of Michigan catalog:

1. Type TELNET HERMES.MERIT.EDU from any host connected to the Internet.

2. At the HOST? prompt, enter MIRLYN.

3. At the terminal type prompt, type VT100.

4. On the UofM screen, press RETURN.

See the "Using NOTIS" section for instructions.

To exit, hit the TELNET escape key.

University of Minnesota

Location: Twin Cities, Minnesota USA

The University of Minnesota library system (Lumina) contains information on the libraries of the

Twin Cities campus.

To access Lumina:

1. Type TELNET LUMINA.LIB.UMN.EDU.

2. When prompted for terminal type, enter 2 for VT100 emulation.

3. When prompted to do so, type LUMINA.

4. On the Integrated Network Access screen, enter A.

See the "Using NOTIS" section for usage instructions.

To exit, hit the TELNET escape key.

University of Missouri at Columbia

Location: Columbia, Missouri USA

To access the University of Missouri at Columbia campus:

1. Type TN3270 UMCVMB.MISSOURI.EDU.

2. TAB down to command prompt.

3. Enter DIAL VTAM.

4. At the VTAM LOGON prompt, enter LIBCICS.

To exit:

1. Type #LOGOFF.

2. When VTAM LOGON or UNDIAL appears on the screen, type UNDIAL.

University of Missouri at Rolla

Location: Rolla, Missouri USA

To access the University of Missouri at Rolla catalog:

1. Type TN3270 UMRVMB.UMR.EDU.

2. Press <RETURN>.

3. At the CP READ prompt, enter DIAL VTAM.

4. Enter LUMIN.

5. Press <RETURN>.

To exit:

1. Type #LOGOFF.

2. Enter /NET at the Enter Application Name prompt.

3. Enter UNDIAL.

University of Missouri at St. Louis

Location: St. Louis, Missouri USA

To access the University of Missouri at St. Louis library:

1. Type TN3270 UMSLVMA.UMSL.EDU.

2. TAB down to COMMAND prompt.

3. Enter DIAL VTAM.

4. At the VTAM LOGON prompt, enter LIBCICS.

To exit:

1. Type #LOGOFF.

2. When VTAM LOGON appears, enter UNDIAL.

University of Nebraska

Location: Nebraska USA

To access the University of Nebraska Library:

1. Type TELNET UNLLIB.UNL.EDU.

2. At the login: prompt, type LIBRARY.

3. Select V for type of terminal.

4. Enter Y to confirm.

See the "Using Innovative Interfaces" appendix for more details.

To logoff:

1. Enter D.

University of Nevada Las Vegas

To access the UNLV library:

1. Type TELNET LIBRARY.LV-LIB.NEVADA.EDU.

2. At the login: prompt, type LIBRARY.

3. Select V for type of terminal.

4. Enter Y to confirm.

See the "Using Innovative Interfaces" appendix for more details.

To logoff:

1. Type n to return to the Main Menu.

2. Enter D.

University of Newcastle

Location: Australia

To access:

1. Type TELNET LIBRARY.NU.OZ.AU.

2. At the username prompt, type ALLEYCAT.

To exit:

1. Type 0.

University of New Brunswick

Location: New Brunswick, Canada

To access:

1. Type TN3270 UNBMVS1.CSD.UNB.CA.

2. Choose option 8 (Phoenix) on the menu.

To disconnect, use the TN3270 escape key.

University of New England

Location: Australia

To access:

1. Type TELNET OPAC.UNE.OZ.AU.

2. When connected, type PAC.

See the "Using VTLS" appendix for more details.

To disconnect, use the TELNET escape key.

University of New Mexico

Location: Albuquerque, New Mexico USA

To log in the University of New Mexico library:

1. Type TELNET BOOTES.UNM.EDU.

2. At the username prompt, type STUDENT1.

3. At the terminal type prompt, type VT100.

4. On the Main menu, choose option 3.

5. On the Library menu, choose option 1.

To exit:

1. Press CTRL-] C.

2. Enter 0 on the Library menu.

3. Enter 0 on the Main menu.

University of New South Wales

Location: Kensington, NSW Australia

To access:

1. Type TELNET LIBPRIME.LIBSYS.UNSW.OZ.AU.

2. Enter login libcat.

To exit, use the TELNET escape key.

University of North Texas

Location: Denton, TX USA

1. Type TELNET LIBRARY.UNT.EDU.

See the "Using VTLS" section for more information.

To exit, hit the TELNET escape key.

University of Notre Dame

Location: Indiana USA

To access the University of Notre Dame catalog (UNLOC):

1. Type TELNET IRISHMVS.CC.ND.EDU.

2. At the ENTER COMMAND OR ’HELP’: prompt, enter library.

See the "Using NOTIS" section for instructions on.

Exiting: 1. Type x.

2. At the ENTER COMMAND OR ’HELP’ prompt, type bye.

University of Oregon

Location: Oregon USA

To connect to the University of Oregon library:

1. Type TELNET JANUS.UOREGON.EDU.

2. Press <RETURN> several times.

3. At the login: prompt, enter janus.

4. When asked for terminal type, enter v.

5. Enter y to confirm.

See the "Using Innovative Interfaces" appendix for more details.

To disconnect:

1. Type x.

University of Pennsylvania

Location: Pennsylvania USA

To access the University of Pennsylvania catalog:

1. Type TELNET PENNLIB.UPENN.EDU.

2. Enter VT100 as terminal type.

or

1. Type TELNET ISN.UPENN.EDU from any host connected to the Internet.

2. Press RETURN twice.

3. At the DIAL prompt, type PENNLIN.

4. Press RETURN twice.

5. Enter VT100 as terminal type.

See the "Using NOTIS" section for instructions.

To exit, hitting the TELNET escape key.

University of Pittsburgh

Location: Pittsburgh, Pennsylvania USA

To access the University of Pittsburgh library catalog:

1. Type TELNET GATE.CIS.PITT.EDU.

2. At the Service: prompt, type PITTCAT.

3. At the Select: prompt, type V100.

See the "Using NOTIS" section for detailed instructions.

To exit, hit CTRL-\.

University of Queensland

Location: St. Lucia, Queensland Australia

To access:

1. Type TELNET LIBSYS.CC.UQ.OZ.AU.

2. Enter BE when prompted to.

To exit:

1. Type END or BYE.

University of Saskatchewan

Location: Saskatchewan, Canada

To use the University of Saskatchewan library system:

1. Type TELNET SKDEVEL2.USASK.CA or TELNET SKDEVEL.USASK.CA.

2. At the REQUEST prompt, type LIB.

See the "Using GEAC" section for more information.

To exit, type END.

University of Saskatchewan also has information in the INFOACCESS database. To access this

database, do the following:

1. Type TELNET SKLIB.USASK.CA.

2. AT the USERNAME prompt, type SONIA.

To exit, type QUIT.

University of Tennessee at Knoxville

Location: Knoxville, Tennessee USA

To access the Univ. of Tennessee library:

1. Type TELNET DCA.UTK.EDU.

2. Enter LIBRARY at ENTER HOST NAME OR HELP prompt.

3. Note you may be queued for a while before you are finally connected.

Hit the TELNET escape key to exit.

University of Tennessee at Memphis

Location: Memphis, Tennessee USA

To access the Univ. of Tennessee at Memphis library:

1. Type TELNET UTMEM1.UTMEM.EDU.

2. At the Username prompt, type HARVEY.

To exit, just press RETURN on the main screen.

University of Texas Arlington

Location: Arlington, Texas USA

To access LUIS, perform the following steps:

1. Type TELNET ADMIN.ARL.UTEXAS.EDU.

2. As soon as you are connected, hit RETURN.

3. At the TERMINAL TYPE prompt, type VT100.

4. At the VTAM selection menu, type NOTIS.

5. At the CICS Logo Screen, press RETURN.

6. On the next screen, type LUUT.

See the "Using NOTIS" section for instructions.

Exiting: 1. Hit Keypad ENTER followed by PF4.

2. Type LOGOFF.

3. Type LOGOFF again.

Please note that some terminal packages remap the keyboard. For example, in Procomm Keypad

ENTER is SHIFT-F10 and PF4 is SHIFT-F2. Keypad ENTER is equivalent to ESC O M. PF4

is equivalent to ESC O S.

University of Texas Austin

Location: Austin, Texas USA

To access UTCAT, follow these steps:

1. Type TELNET UTAUS.CC.UTEXAS.EDU or SET HOST UTAUS.

2. At the Username: prompt, enter AUSCAT.

3. Press 1 and the Keypad ENTER key at the UT Library Information Systems screen.

4. At the Welcome to the UT Library Online Catalog screen, press the Keypad ENTER

key.

Exiting: 1. Type STOP followed by Keypad ENTER

2. Type 4 followed by Keypad ENTER

University of Texas at Dallas

Location: Richardson, Texas USA

The SOL library system can be accessed in two ways:

1. Type TN3270 VM.UTDALLAS.EDU.

2. Hit ENTER to clear the login screen.

3. Type library to enter the library computer system.

or

1. Type TELNET IBM.UTDALLAS.EDU.

2. At the TERMINAL TYPE: prompt, type VT10X.

3. Hit ENTER to clear the login screen.

4. Type library to enter the library computer system.

See the "Using NOTIS" section for details.

Exiting: 1. Type QUIT if using TN3270.

2. If TELNET is being used, hit the TELNET escape key.

University of Texas Health Science Center at San Antonio and the University of

Texas Health Center at Tyler

Location: Tyler/San Antonio, Texas USA

To access the two library systems, just do the following steps:

1. Type SET HOST ATHENA from the VAXcluster.

2. At the Username: prompt, type LIS.

3. On the Biomedical Library Information System screen, type 1.

Now you are accessing the UT Health Science Center at San Antonio Library system. To access

the UT Health Center at Tyler Library system, just type 0 on the Library Catalog Screen and then

type 2 on the Change Location -- Library Catalogs Screen.

To exit, just keep hitting RETURN until you are logged off of the node ATHENA.

University of Toledo

Location: Toledo, Ohio USA

To access the University of Toledo library:

1. Type TN3270 UOFT01.UTOLEDO.EDU.

2. Press RETURN on UT logo screen.

3. When "enter one of the following commands..." appears, enter DIAL MVS.

4. When "dialed to mvs ####" appears, enter UTMOST.

For more instructions, see the "Using NOTIS" section.

To exit, type DISC.

University of Toronto

Location: Toronto, Canada

To access the University of Toronto online catalog:

1. Type TELNET 128.100.100.32.

2. At the Branch prompt, type the branch name in CAPS.

To exit, use your TELNET escape key.

University of Utah

Location: Provo, Utah USA

To access the University of Utah on-line catalog:

1. Type TN3270 LIB.UTAH.EDU.

2. Hit TAB to get to COMMAND line.

3. At the COMMAND line, type DIAL UNIS.

See the "Using NOTIS" section for details.

To exit, use the TELNET escape key.

University of Wales College of Cardiff

Location: Wales

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. At the hostname prompt, enter UK.AC.CARDIFF.LIBRARY.

3. At the Username prompt, enter LIBRARY.

4. Enter 1 as the terminal model.

See the "Using Libertas" section for more information.

To exit, type EXIT.

University of Western Australia

Location: Nedlands, Western Australia

To access:

1. Type TELNET FENNEL.CC.UWA.OZ.AU.

2. At the Username prompt, enter library.

3. When prompted if you have a VT100 terminal, enter Y.

To exit, hit CTRL-D.

University of Wisconsin

Location: Madison/Milwaukee, Wisconsin USA

To access the University of Wisconsin library:

1. Type TN3270 BLUE.ADP.WISC.EDU.

2. At the menu, TAB to the left of the NLS1 selection.

3. Push <RETURN>.

4. At the next prompt, just push <RETURN> for the Madison Catalog. For the Milwaukee

catalog, type MIL and press <RETURN>.

or

1. Type TELNET NLS.ADP.WISC.EDU.

2. Hit <RETURN> when prompted for terminal type.

3. At the menu, TAB to the left of the NLS1 selection.

4. Push <RETURN>.

5. At the next prompt, just push <RETURN> for the Madison Catalog. For the Milwaukee

catalog, type MIL and press <RETURN>.

To exit:

1. Type EXIT.

2. At the menu, TAB to the left of the QUIT selection.

3. Push <RETURN>.

University of York

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. At the hostname prompt, enter UK.AC.YORK.LIBRARY.

4. Select 1 for VT100.

5. Enter Y to the screen readability question.

6. Press RETURN.

See the "Using Dynix" section for more information.

To exit, type 7.

Vanderbilt University

Location: Tennessee USA

To access Acorn, Vanderbilt’s library:

1. Type TELNET CTRVAX.VANDERBILT.EDU.

2. At the username prompt, enter ACORN.

3. Answer Y to the "are you ready to proceed?" question.

4. Press RETURN when "SysAvl Appl" appears on the screen.

See the "Using NOTIS" section for more information.

To exit:

1. Hit CTRL-Z.

Victoria University of Wellington

Location: Wellington, New Zealand.

To access the Victoria University library catalog:

1. Type TELNET LIBRARY.VUW.AC.NZ.

2. Press RETURN.

3. Enter LIB when asked for service.

4. Press RETURN when told to.

5. At the LOGON prompt, enter PUB.

To exit:

1. Pick Quit Search menu option.

2. Enter LATER.

Virginia Commonwealth University

Location: Richmond, Virginia USA

To use the Virginia Commonwealth library system:

1. Type TN3270 VCUVM1.VCU.EDU.

2. On the VM screen, TAB down to the Command prompt.

3. Type DIAL VTAM.

4. Enter L on the VTAM screen.

5. Press ENTER when prompted to.

See the "Using NOTIS" section for usage instructions.

To exit:

1. Hit CTRL-Z.

2. When the screen blanks, type LOGOFF.

3. At the VTAM screen, type UNDIAL.

Virginia Tech

Location: Virginia USA

To login the Virginia Tech library system:

1. Type TELNET VTNET1.CNS.VT.EDU.

2. At the CALL, DISPLAY, OR MODIFY prompt, type CALL VTLS.

3. Hit <RETURN> once or twice.

See the "Using VTLS" section for more information.

To exit, hit the TELNET escape key.

Warwick University

Location: UK

To access:

1. Type TELNET SUN.NSF.AC.UK.

2. Enter janet at the login prompt.

3. Enter UK.AC.WARWICK.OPAC at the hostname prompt.

4. After connection is established, press RETURN.

See the "Using BLCMP" section for more information.

To exit, use the TELNET escape key.

Washington University-St. Louis

Location: St. Louis, Missouri USA

To access WUSTL’s library computer:

1. Type TELNET WUGATE.WUSTL.EDU.

2. At the login: prompt, type LUIS.

3. Choose VT100 as the terminal type.

4. On the menu, choose option 1.

See the "Using NOTIS" section for usage instructions.

To exit the library, hit the TELNET escape key.

Wayne State University

To log into the Wayne State University library system:

1. Type TN3270 CMS.CC.WAYNE.EDU.

2. Use TAB to move down to COMMAND line.

3. At the COMMAND line, type DIAL VTAM.

4. At the WSUNET menu, type LUIS.

See the "Using NOTIS" section for more information.

To logout:

1. Type LOGOFF.

Wright State University

To access the Wright State University library:

1. Type TELNET DESIRE.WRIGHT.EDU.

2. At the Username prompt, type LIBNET.

3. At the Password prompt, type LIBRARY.

4. Select 1 on the menu. The other choices are local only.

See the "Using DRA Altas" section for more information.

To logoff, hit the TELNET escape key.

York University

Location: Toronto Canada

To access the York University online catalog:

1. Type TELNET YORKLINE.YORKU.CA.

2. At the ENTER TERM TYPE: prompt, enter VT100.

3. On the Yorkline screen, hit RETURN.

See the "Using NOTIS" section for more details.

To exit, type X.

Appendix A: Using DRA Altas

Author searches: To search for a particular author, use the a= search command followed by

the author’s name.

Example: a=Haley Alex

Subject searches: To search for a particular subject, use the s= search command followed by

the subject.

Example: s=Stars

Title searches: To search for a particular title, use the t= search command followed by the

title.

Example: t=Winds of War

Appendix B: Using BLCMP

Sorry, this section has not been written yet. If you have instructions on using BLCMP, please

send them to BILLY@VAXB.ACS.UNT.EDU.

Appendix C: Using CATS

Sorry, this section has not been written yet. If you have instructions on using CATS, please

send them to BILLY@VAXB.ACS.UNT.EDU

Appendix D: Using GEAC

Title searches: To search for a particular title, use the TIL search command followed by

the title.

Example: TIL Tao of Programming

Author searches: To search for a particular autho, use the AUT search command followed

by the name of the author.

Example: AUT Clancy

Subject searches: To search for a particular subject, use the SUB search command followed

by the subject.

Example: SUB Sidewalks

Keyword searches: To search for a particular keyword, use the KEY search command

followed by a string.

Example: KEY Alligators

Help: To see help, type HELP.

Previous Screen: To see previously displayed screens, type BAC.

Next Screen: The next screen is usually displayed by typing FOR.

Picking an item: On screens where a list of items appears, a particular item can be selected

by typing the number to the right of item.

Appendix E: Using Innovative Interfaces

Unfortunately, the Innovative Interfaces’ menues appear to be customized for each site and have

little consistency. However, this turns out to not be much of a problem as the system is totally

menu-driven and fairly easy-to-use.

Title searches: To search for a particular title, select T on the main menu.

Author searches: To search for a particular author, select A on the main menu.

Subject searches: To search for a particular subject, select S on the main menu.

All the other commands vary from system to system.

Appendix F: Using Libertas

Sorry, this section has not been written yet. If you have instructions on using Libertas, please

send them to BILLY@VAXB.ACS.UNT.EDU

Appendix G: Using NOTIS

Title searches: To search for a particular title, use the t= search command followed by the

title.

Example: t=foundation

Author searches: To search for a particular author, use the a= search command followed by

the author’s name.

Example: a=asimov

Subject searches: To search for a particular subject, use the s= search command followed by

the subject.

Example: s=tennis

Keyword searches: To search for a particular keyword, use the k= search command followed

by a string.

Example: k=cry wolf

You may use the logical operator (AND, OR, NOT) and

parenthesis to group the operators. Also, $ is a wildcard character.

Examples: k=car and fast

k=computer and not ibm

k=comp$ and (toy or game)

Help: On most screens, help can be seen by the h command.

Picking an item: On screens where a list of items appears, a particular item can be selected

by typing the number to the right of item.

Appendix H: Using UTCAT

You should be at the UT Library Online Catalog -- Search Choices Menu. From this menu, you

may type 1 or 2 letter search commands and the word(s) you want to search for. After your

search command is typed in, hit the keypad ENTER key.

AUTHOR searches: To search for a particular author, you use the A (Author) search command

followed by the author’s name.

Example: a mowat, farley

To see the index of authors, you use the AI (Author Index) search

command followed by the first author you wish to see.

Example: ai mowat, farley

TITLE searches: To search for a particular title, you use the T (Title) search

command followed by the title of the book.

Example: t never cry wolf

To see the index of titles, you can use the TI (Title Index) search

command followed by the first title you wish to see.

Example: ti never cry wolf

To search for certain keywords in a title, you can use the TK (Title

Keyword) search command.

Example: tk wolf cry

SUBJECT searches: To search by subject, you can use the S (Subject) search command.

Example: s wolves

Also, from the Search Choices Menu, you can type 3 letter commands followed by Keypad Enter

or their equivalent PF keys.

BACk (PF1) To page back and review up to 10 screens of results.

REPeat (PF2) To repeat the last search typed in.

INDex (PF3) To move from brief or full records to the corresponding index.

EXPlain (PF4) To view general information about the Online Catalog.

NEWs (PF5) To view current information about Online Catalog developments.

HELp (PF6) To see context sensitive help.

MENu (PF7) To move back to the Search Choices Menu.

STOp (PF8) To exit from the Online Catalog.

COMment Send comments to library staff.

Finally, if a list of items is on the screen, you can type the number of the item you wish to see.

Please note that some terminal packages remap the keypad ENTER key to other keys. For

example, in Procomm the equivalent to Keypad ENTER is Shift-F10. Keypad ENTER is

equivalent to ESC O M.

Appendix I: Using VTLS

Advanced User Search System:

Author searches: To search for a particular author, use the A/ search command

followed by the author’s name.

Example: A/Hemingway, Ernest

Title searches: To search for a particular title, use the T/ search command

followed by the title. Omit any leading articles such as THE, A,

AN, LA, ...

Example: T/Sun also rises

Subject searches: To search for a particular subject, use the S/ search command

followed by the subject.

Example: S/Metals

Keyword searches: To search for a keyword, use the W/ search command followed by

the subject.

Example: W/Computers

Boolean Keyword: To search for keywords with boolean operators, use the B/ search

command followed by a keyword, then an operator, and then the

second keyword.

Example: B/Ocean and Island

B/Dog or Cat

Help: To see help, type /HELP.

Previous Screen: To see previously displayed screens, type PS.

Next Screen: The next screen is usually displayed by typing NS.

Novice User Search System

The Novice User Search System can be accessed at any time by typing ?. This novice

mode is an easy to use menu driven method of searching. In addition, the novice mode

also offers training on using the Advanced User Search System. Advanced User Search

System commands may be typed in at any novice level prompt.

Appendix J: TELNET/TN3270 Escape Keys

System Package Escape Key(s)

MS-DOS CUTCP

1

ALT-X

KA9Q F10

MD-DOSIP ALT-<space>

NCSA TELNET ALT-X

PCIP F10 Q Y

PC/TCP F10 c

PC-NFS F10

Macintosh NCSA

2

Apple-K

VAX/VMS CMU CTRL-^ c

Multinet TELNET CTRL-^ q

Multinet TN3270 CTRL-C q

WIN/TCP TELNET

3

CTRL-] q

WIN/TCP TN3270

3

CTYL-Y

Unix

4

TELNET CTRL-] q

TN3270 CTRL-C q

Notes:

1. CUTCP is the TCP/IP package used by the majority of PC users on the UNT campus.

2. NCSA is the TCP/IP package used by the majority of Mac users on the UNT campus.

3. The UNT VAX/VMS uses WIN/TCP TELNET and TN3270.

4. These keys should work on all BSD based systems such as the Sequent. The System V

Unix keys are unknown.